<?xml version="1.0" encoding="utf-8"?>
<!DOCTYPE eagle SYSTEM "eagle.dtd">
<eagle version="9.7.0">
<drawing>
<board>
<plain>
<wire x1="0" y1="0" x2="159" y2="0" width="0" layer="20"/>
<wire x1="159" y1="0" x2="159" y2="16" width="0" layer="20"/>
<wire x1="159" y1="16" x2="0" y2="16" width="0" layer="20"/>
<wire x1="0" y1="16" x2="0" y2="0" width="0" layer="20"/>
<hole x="6" y="8" drill="3.2"/>
</plain>
<libraries>
<library name="Connector-new">
<packages>
<package name="HW4-2.0-90D">
</package>
</packages>
</library>
<library name="Bourns-PTB">
<packages>
<package name="SLIDEPOT-100">
<description>128mm x 15mm, 100mm travel, Single Gang</description>
</package>
</packages>
</library>
</libraries>
<attributes>
</attributes>
<variantdefs>
</variantdefs>
<elements>
<element name="J1" library="Connector-new" package="HW4-2.0-90D" value="">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="TM1" library="Bourns-PTB" package="SLIDEPOT-100" value="">
<attribute name="NAME"/>
<attribute name="PACKAGE" value=""/>
<attribute name="VALUE"/>
</element>
</elements>
<signals>
<signal name="VCC">
<contactref element="J1" pad="3"/>
<contactref element="TM1" pad="1"/>
</signal>
<signal name="GND">
<contactref element="J1" pad="4"/>
<contactref element="TM1" pad="3"/>
</signal>
<signal name="N$1">
<contactref element="J1" pad="1"/>
<contactref element="TM1" pad="2"/>
</signal>
</signals>
</board>
</drawing>
</eagle>
