<?xml version="1.0" encoding="utf-8"?>
<!DOCTYPE eagle SYSTEM "eagle.dtd">
<eagle version="9.6.1">
<drawing>
<board>
<plain>
<wire x1="0" y1="0" x2="79.99" y2="0" width="0" layer="20"/>
<wire x1="79.99" y1="0" x2="79.99" y2="25.07" width="0" layer="20"/>
<wire x1="79.99" y1="25.07" x2="0" y2="25.07" width="0" layer="20"/>
<wire x1="0" y1="25.07" x2="0" y2="0" width="0" layer="20"/>
</plain>
<libraries>
<library name="fabisp">
<description>Generated from &lt;b&gt;fabisp.sch&lt;/b&gt;&lt;p&gt;
by exp-lbrs.ulp</description>
<packages>
<package name="RCL_C1206">
<description>&lt;b&gt;CAPACITOR&lt;/b&gt;</description>
</package>
<package name="ATTINY24_44_84_SOIC14">
<description>&lt;b&gt;Small Outline Package&lt;/b&gt;</description>
</package>
<package name="CRYSTAL_SM49">
<description>&lt;b&gt;CRYSTAL&lt;/b&gt;</description>
</package>
<package name="RCL_M1206">
<description>&lt;b&gt;RESISTOR&lt;/b&gt;&lt;p&gt;
MELF 0.25 W</description>
</package>
</packages>
</library>
<library name="fab">
<packages>
<package name="C1206FAB">
</package>
<package name="R1206FAB">
</package>
<package name="USB_MINIB">
</package>
</packages>
</library>
<library name="pinhead">
<description>&lt;b&gt;Pin Header Connectors&lt;/b&gt;&lt;p&gt;
&lt;author&gt;Created by librarian@cadsoft.de&lt;/author&gt;</description>
<packages>
<package name="1X16/90">
<description>&lt;b&gt;PIN HEADER&lt;/b&gt;</description>
</package>
<package name="1X02/90">
<description>&lt;b&gt;PIN HEADER&lt;/b&gt;</description>
</package>
</packages>
</library>
<library name="led">
<description>&lt;b&gt;LEDs&lt;/b&gt;&lt;p&gt;
&lt;author&gt;Created by librarian@cadsoft.de&lt;/author&gt;&lt;br&gt;
Extended by Federico Battaglin &lt;author&gt;&amp;lt;federico.rd@fdpinternational.com&amp;gt;&lt;/author&gt; with DUOLED</description>
<packages>
<package name="CHIPLED_1206">
<description>&lt;b&gt;CHIPLED&lt;/b&gt;&lt;p&gt;
Source: http://www.osram.convergy.de/ ... LG_LY N971.pdf</description>
</package>
</packages>
</library>
<library name="pot">
<description>&lt;b&gt;Potentiometers&lt;/b&gt;&lt;p&gt;
Beckman, Copal, Piher, Spectrol, Schukat&lt;p&gt;
&lt;author&gt;Created by librarian@cadsoft.de&lt;/author&gt;</description>
<packages>
<package name="PT-10S">
<description>&lt;b&gt;POTENTIOMETER&lt;/b&gt;</description>
</package>
</packages>
</library>
</libraries>
<attributes>
</attributes>
<variantdefs>
</variantdefs>
<elements>
<element name="C1" library="fabisp" package="RCL_C1206" value="">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="C2" library="fabisp" package="RCL_C1206" value="">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="C3" library="fab" package="C1206FAB" value="CAP-US1206FAB">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="IC1" library="fabisp" package="ATTINY24_44_84_SOIC14" value="ATTINY24_44_84_ATTINY24/44/84-SSU">
<attribute name="VALUE"/>
</element>
<element name="JP1" library="pinhead" package="1X16/90" value="">
<attribute name="NAME"/>
<attribute name="POPULARITY" value="0"/>
<attribute name="VALUE"/>
</element>
<element name="JP2" library="pinhead" package="1X02/90" value="">
<attribute name="NAME"/>
<attribute name="POPULARITY" value="24"/>
<attribute name="VALUE"/>
</element>
<element name="LED1" library="led" package="CHIPLED_1206" value="">
<attribute name="NAME"/>
<attribute name="POPULARITY" value="28"/>
<attribute name="VALUE"/>
</element>
<element name="LED2" library="led" package="CHIPLED_1206" value="">
<attribute name="NAME"/>
<attribute name="POPULARITY" value="28"/>
<attribute name="VALUE"/>
</element>
<element name="LED3" library="led" package="CHIPLED_1206" value="">
<attribute name="NAME"/>
<attribute name="POPULARITY" value="28"/>
<attribute name="VALUE"/>
</element>
<element name="LED4" library="led" package="CHIPLED_1206" value="">
<attribute name="NAME"/>
<attribute name="POPULARITY" value="28"/>
<attribute name="VALUE"/>
</element>
<element name="Q1" library="fabisp" package="CRYSTAL_SM49" value="">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="R1" library="fabisp" package="RCL_M1206" value="">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="R2" library="fabisp" package="RCL_M1206" value="">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="R3" library="fabisp" package="RCL_M1206" value="">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="R4" library="fabisp" package="RCL_M1206" value="">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="R5" library="fab" package="R1206FAB" value="">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="R6" library="pot" package="PT-10S" value="">
<attribute name="NAME"/>
<attribute name="POPULARITY" value="0"/>
<attribute name="VALUE"/>
</element>
<element name="U$1" library="fab" package="USB_MINIB" value="USB_MINIB">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="R7" library="fab" package="R1206FAB" value="000">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
</elements>
<signals>
<signal name="N$1">
<contactref element="R1" pad="2"/>
<contactref element="LED1" pad="C"/>
</signal>
<signal name="N$2">
<contactref element="R2" pad="2"/>
<contactref element="LED2" pad="C"/>
</signal>
<signal name="N$3">
<contactref element="R3" pad="2"/>
<contactref element="LED3" pad="C"/>
</signal>
<signal name="N$4">
<contactref element="LED4" pad="C"/>
<contactref element="R4" pad="2"/>
</signal>
<signal name="VCC">
<contactref element="LED1" pad="A"/>
<contactref element="LED2" pad="A"/>
<contactref element="LED3" pad="A"/>
<contactref element="LED4" pad="A"/>
<contactref element="JP1" pad="2"/>
<contactref element="IC1" pad="1"/>
<contactref element="C3" pad="1"/>
<contactref element="JP2" pad="1"/>
<contactref element="R6" pad="E"/>
<contactref element="R7" pad="2"/>
</signal>
<signal name="GND">
<contactref element="C1" pad="2"/>
<contactref element="C2" pad="2"/>
<contactref element="IC1" pad="14"/>
<contactref element="C3" pad="2"/>
<contactref element="JP2" pad="2"/>
<contactref element="JP1" pad="1"/>
<contactref element="JP1" pad="5"/>
<contactref element="R6" pad="A"/>
</signal>
<signal name="N$5">
<contactref element="Q1" pad="1"/>
<contactref element="IC1" pad="2"/>
<contactref element="C2" pad="1"/>
</signal>
<signal name="N$6">
<contactref element="IC1" pad="3"/>
<contactref element="C1" pad="1"/>
<contactref element="Q1" pad="2"/>
</signal>
<signal name="V0">
<contactref element="JP1" pad="3"/>
<contactref element="R6" pad="S"/>
</signal>
<signal name="D0">
<contactref element="JP1" pad="7"/>
</signal>
<signal name="D1">
<contactref element="JP1" pad="8"/>
</signal>
<signal name="D2">
<contactref element="JP1" pad="9"/>
</signal>
<signal name="D3">
<contactref element="JP1" pad="10"/>
</signal>
<signal name="A">
<contactref element="JP1" pad="15"/>
</signal>
<signal name="K">
<contactref element="JP1" pad="16"/>
</signal>
<signal name="MISO">
<contactref element="U$1" pad="D+"/>
<contactref element="IC1" pad="8"/>
</signal>
<signal name="MOSI">
<contactref element="U$1" pad="D-"/>
<contactref element="IC1" pad="7"/>
</signal>
<signal name="RST">
<contactref element="U$1" pad="VBUS"/>
<contactref element="IC1" pad="4"/>
<contactref element="R5" pad="1"/>
</signal>
<signal name="SCK">
<contactref element="U$1" pad="GND"/>
<contactref element="IC1" pad="9"/>
</signal>
<signal name="RS">
<contactref element="JP1" pad="4"/>
<contactref element="IC1" pad="10"/>
</signal>
<signal name="E">
<contactref element="JP1" pad="6"/>
<contactref element="IC1" pad="11"/>
</signal>
<signal name="D4">
<contactref element="JP1" pad="11"/>
<contactref element="IC1" pad="12"/>
<contactref element="R1" pad="1"/>
</signal>
<signal name="D5">
<contactref element="JP1" pad="12"/>
<contactref element="IC1" pad="13"/>
<contactref element="R2" pad="1"/>
</signal>
<signal name="N$7">
<contactref element="R5" pad="2"/>
<contactref element="R7" pad="1"/>
</signal>
<signal name="D6">
<contactref element="JP1" pad="13"/>
<contactref element="IC1" pad="6"/>
<contactref element="R3" pad="1"/>
</signal>
<signal name="D7">
<contactref element="IC1" pad="5"/>
<contactref element="JP1" pad="14"/>
<contactref element="R4" pad="1"/>
</signal>
</signals>
</board>
</drawing>
</eagle>
